         180           3
   20.4707197225392        21.5660038775425        22.6613688342600     
  -6.97442500905581       -5.88456831775320       -4.09225187767328     
  2.293502707427431E-003  0.000000000000000E+000
  0.987883707009143       0.000000000000000E+000
  0.985449230124663       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
