         180           3
   18.4610715022167        19.9370839533228        21.9697137893747     
  -4.69096024408240       -3.76569134384495       -3.06198768070603     
  2.276972261156317E-003  0.000000000000000E+000
  0.987424573200836       0.000000000000000E+000
  0.984844179481711       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
