         180           8
   14.4003779884721        14.1206856023819        13.9365186312657     
   13.7409118461660        13.4993051988406        13.3127511779124     
   13.1167558008620        12.9123989116701     
  -6.08831617397200       -5.92562074920640       -5.66586553313688     
  -5.35673280295732       -5.11258932515425       -4.92270983835578     
  -4.79415613680580       -4.70713189756353     
 -7.393986495762939E-003  0.000000000000000E+000
   1.01030734416833       0.000000000000000E+000
   1.01402947960437       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
