         180           8
   12.9266823237837        12.4933105419341        12.2417226175095     
   12.0282217309213        11.8550394381748        11.7179414706374     
   11.5316772806533        11.2452701993736     
  -5.58973877437647       -5.44315243206331       -5.33933735969922     
  -5.11349720143721       -4.73750006962368       -4.42981731404601     
  -4.22888508827141       -3.99120655161582     
 -7.416830672521716E-003  0.000000000000000E+000
   1.00991358170211       0.000000000000000E+000
   1.01410626234026       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
