         180           8
   12.0828040796433        11.7581680780036        11.5427002447277     
   11.3386397683201        11.0652581127992        10.8621051498271     
   10.8114063196513        10.6659507604374     
  -5.66113763958495       -5.42134027179837       -5.19349572924180     
  -4.92025386743546       -4.76777743840258       -4.66698199001148     
  -4.31860581542081       -3.96006794535001     
 -7.465505912804426E-003  0.000000000000000E+000
   1.00987604367397       0.000000000000000E+000
   1.01391743015373       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
