         180           3
   20.9552016330492        21.3049404778865        23.0106110447837     
  -7.48925102608823       -5.31066272856877       -4.97620306654258     
  2.418972082753197E-003  0.000000000000000E+000
  0.987373506927222       0.000000000000000E+000
  0.984797029760852       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
