         180           8
   11.5461911578464        11.2720956972062        11.0818615724275     
   10.7934167110980        10.5307963042633        10.3187551066781     
   10.0755231217706        9.98786194789777     
  -6.14056625018572       -5.94335169950710       -5.68482754182232     
  -5.47715159949648       -5.12949302574250       -4.86131028370896     
  -4.67777518035903       -4.36634358366628     
 -7.544547159823332E-003  0.000000000000000E+000
   1.00963361131462       0.000000000000000E+000
   1.01353698849858       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
