         180           3
   19.7636237620626        20.7962400489961        23.0226620799035     
  -6.47460091129265       -4.94356221797931       -4.67369253551680     
  2.198518504557053E-003  0.000000000000000E+000
  0.987485179454921       0.000000000000000E+000
  0.985064517569757       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
