         180           3
   18.6825605108486        20.5027069984781        21.4874080579450     
  -4.99946278621401       -4.27278533106523       -2.53413714727048     
  2.168455235678287E-003  0.000000000000000E+000
  0.987439234350477       0.000000000000000E+000
  0.984817298099235       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
