         180           8
   10.6968674479042        10.3317890769215        10.1410532873023     
   10.0912308552498        9.99004189761969        9.80061224722302     
   9.56126782835662        9.41489508444143     
  -6.00107603732404       -5.84129985076757       -5.71267923994439     
  -5.36880182035387       -4.98057283970248       -4.77459004979556     
  -4.58855176539647       -4.40088980976412     
 -7.582227102326350E-003  0.000000000000000E+000
   1.01001150749810       0.000000000000000E+000
   1.01402043834867       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
