         180           3
   26.2022282830751        23.4600661385804        21.0924805528682     
  -5.02103066143635       -5.02901096228102       -4.60479031417800     
  2.667383636031914E-003  0.000000000000000E+000
  0.987097253246375       0.000000000000000E+000
  0.984342411126077       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
