         180           8
   17.9376997797054        17.1406163909565        16.4248429723873     
   15.6816540309876        14.9483407235570        14.2318816374224     
   13.5301948710679        12.9055880760491     
  -6.73334911817679       -6.81078301700819       -6.93525565918328     
  -7.21033104062459       -7.49194240422426       -7.58127186511880     
  -7.59568171768552       -7.63260114280041     
 -7.555808563745934E-003  0.000000000000000E+000
   1.00991595848236       0.000000000000000E+000
   1.01379159477225       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
