         180           8
   28.3598753279005        27.2853806117509        26.6827560940874     
   25.9508761474480        25.1745022232843        24.5491760686203     
   23.8590778886712        27.9827693994138     
  -7.56606300606289       -7.10658710155101       -7.41587138856727     
  -7.69443077265914       -7.98954021257078       -8.22822664531835     
  -8.66028036040947       -11.2678776509173     
  3.283900739589008E-003  0.000000000000000E+000
  0.987351617630137       0.000000000000000E+000
  0.984587040460221       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
