         180           8
   23.4146690072104        22.3679130643988        21.6634402404462     
   20.9384554817693        20.2066701095336        19.4889649542603     
   18.7982908740171        18.1033636414016     
  -7.68978062732310       -7.52033730615786       -7.63806532581858     
  -7.75446422290451       -7.89402384441122       -8.08445567170657     
  -8.42500961708863       -8.77422847576136     
 -7.319624383812148E-003  0.000000000000000E+000
   1.01001149355763       0.000000000000000E+000
   1.01373029360157       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
