         180           8
   17.7546644533230        17.0659665866654        16.4062529621704     
   15.8303519343212        15.1358536747770        14.4061141468914     
   13.7547817458097        13.1528073149427     
  -6.13732327050567       -6.40423240696068       -6.54153679838431     
  -6.71903705807348       -6.82507947622171       -6.89341127155863     
  -7.05418105397327       -7.22063899272294     
 -7.615864561583498E-003  0.000000000000000E+000
   1.01011872221444       0.000000000000000E+000
   1.01449182939108       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
