         180           8
   16.0575561395124        15.2846698065528        14.5333716644517     
   13.8295670282640        13.1777968406791        12.4219060410665     
   11.6463866748954        11.0035769758257     
  -6.21511726089287       -6.35027758578905       -6.51360744977654     
  -6.73267808237482       -6.82206790353993       -6.79794333096540     
  -6.81879420629027       -6.86711152064933     
 -7.647183260174151E-003  0.000000000000000E+000
   1.00980206201698       0.000000000000000E+000
   1.01386106533608       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
