         180           8
   19.6389473967281        19.0132456637527        18.2391279360019     
   17.4726507455325        16.6429708467303        15.8600532959837     
   15.0659415525809        14.5612804792921     
  -7.00148248562234       -7.01740284343685       -6.93224115886746     
  -7.00132585958432       -7.15587764022813       -7.43339947546542     
  -7.78250503115605       -8.00226493753517     
 -7.403579051219728E-003  0.000000000000000E+000
   1.00970478245153       0.000000000000000E+000
   1.01351793972999       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
