         180           8
   12.5613303707762        12.1077979908168        11.9229333513855     
   11.6618153270726        11.4782540304620        11.3042060403163     
   11.1406182626395        11.0044337674250     
  -6.79739779609953       -6.67435535506993       -6.49250605238992     
  -6.26320586565153       -6.03978633390331       -5.90031220109640     
  -5.79950075836727       -5.62721784702911     
 -7.676201470585135E-003  0.000000000000000E+000
   1.00982287330881       0.000000000000000E+000
   1.01321884058355       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
