         180           8
   26.6127387501247        26.1480344011064        25.2796737853466     
   24.3293267473187        23.4331759653945        22.6066890328298     
   21.7868011639384        21.2785449176248     
  -8.23972347766957       -8.56068487984290       -8.44025637205366     
  -8.29554376646615       -8.42865341181738       -8.53549217955324     
  -8.40409706674220       -9.38532653775020     
  3.162911317797625E-003  0.000000000000000E+000
  0.987760012755353       0.000000000000000E+000
  0.985520116726444       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
