         180           8
   20.9992657861207        20.2358227778030        19.4799710053840     
   18.7180782008077        17.8955166582586        17.0995695479012     
   16.3487580540283        15.5721204485170     
  -7.60900340933510       -7.73384092874779       -7.68886029709534     
  -7.74558479238477       -7.88204808647985       -8.01354015343976     
  -8.13796993094513       -8.39988208634391     
 -7.402772397419985E-003  0.000000000000000E+000
   1.01016697261117       0.000000000000000E+000
   1.01343281708228       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
