         180           8
   27.5985954278191        27.1384744006440        26.2595056482387     
   25.6461962903489        24.9809575090282        24.5691411254900     
   25.9108681923974        21.4134711006978     
  -8.00857179603022       -8.18668880005250       -8.50457921039227     
  -8.80126514305506       -8.93408592648276       -9.33009803587889     
  -11.1611030374788       -7.70858931960508     
  3.352814372466507E-003  0.000000000000000E+000
  0.987834225754779       0.000000000000000E+000
  0.985523504320798       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
