         180           8
   23.7890097277578        23.1932892728478        22.3997400754789     
   21.5998162623753        20.9789665632569        20.3577774024932     
   19.5804529169393        18.8253716667824     
  -7.81248523943196       -7.86426521012021       -7.98222685716473     
  -7.99674740020172       -8.09169676984337       -8.27018751645502     
  -8.35361220946785       -8.50272793719683     
 -7.421989603120508E-003  0.000000000000000E+000
   1.01041569838665       0.000000000000000E+000
   1.01436342469913       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
