         180           8
   19.4597515001019        18.7103459150632        18.0265540519288     
   17.2936614099631        16.6052179308758        15.8634253282880     
   15.0768425942970        14.4553357281511     
  -7.10757268277800       -7.22853137153432       -7.32387029968780     
  -7.41739212845707       -7.53371346770103       -7.69341341342668     
  -7.82937200541590       -7.99955980642950     
 -7.691241824947670E-003  0.000000000000000E+000
   1.01021870228997       0.000000000000000E+000
   1.01473384044943       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
