         180           8
   17.5332129536645        17.1401755813864        16.4037359021190     
   15.6783538376989        14.9849834065725        14.2883728587250     
   13.6605882516154        12.9830376025251     
  -7.07708147706940       -7.24014567476038       -7.37450693472991     
  -7.47587551898384       -7.57889052128067       -7.75706139021397     
  -7.94944937434291       -8.01344154320442     
 -7.768158404805066E-003  0.000000000000000E+000
   1.01044948686447       0.000000000000000E+000
   1.01439094021206       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
