         180           8
   22.6346640325573        22.0843357931490        21.4835565451539     
   20.7826949981871        19.9756827927268        19.2451476997536     
   18.4940607959604        17.9248544701790     
  -8.26961809101808       -8.29711367153421       -8.37494546373453     
  -8.47853393727875       -8.61606126165115       -8.74689820581132     
  -8.87537899683034       -9.02173208705270     
 -7.534766374587462E-003  0.000000000000000E+000
   1.01034215946431       0.000000000000000E+000
   1.01401412165476       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
