         180           8
   17.9654310200285        17.1513315766476        16.4381887958858     
   15.6869028385509        14.9673469212230        14.2819128710213     
   13.6049135153828        12.9894869103917     
  -7.00480501497638       -7.15446843204648       -7.25425107452131     
  -7.38585998731406       -7.53158512140965       -7.73097893325132     
  -7.93957514335005       -8.05381003850239     
 -7.749498902631997E-003  0.000000000000000E+000
   1.01053808739712       0.000000000000000E+000
   1.01448979611960       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
