         180           8
   26.2025762742445        25.4148221377807        24.5976294108936     
   23.7831940620921        23.0520481990066        22.3375598038049     
   21.3710450521561        26.3856414199362     
  -8.27840528550835       -8.39178331958885       -8.51472988321111     
  -8.67449426894371       -8.81480168176611       -8.87159734223086     
  -8.75585563694707       -12.2406421674510     
  2.977900483768560E-003  0.000000000000000E+000
  0.987680645910525       0.000000000000000E+000
  0.984958255741626       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
