         180           8
   20.2072356803595        19.3574912638664        18.5172345495906     
   17.7607636884290        17.0650366752196        16.2998020727549     
   15.4734964046379        14.7589027142885     
  -8.00357082185709       -8.07599580052614       -8.11937330764653     
  -8.28471091486676       -8.45775515703214       -8.57130291782991     
  -8.70669965588107       -8.91403687601229     
 -7.572938008565458E-003  0.000000000000000E+000
   1.00987398278124       0.000000000000000E+000
   1.01348618718898       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
