         180           8
   26.9909255360424        26.4472740523225        26.0879144922693     
   25.2424934648633        24.6356690579440        26.1384388949488     
   25.6548488801586        22.2536867249370     
  -8.51324145060265       -8.82386659516465       -9.17243213699628     
  -9.18771287503752       -9.43994063762188       -11.1952223095774     
  -11.7138059082269       -9.66498846725742     
  3.238548074709098E-003  0.000000000000000E+000
  0.987555404264278       0.000000000000000E+000
  0.985023006792565       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
