         180           8
   22.9574749352606        22.2125456183453        21.5892242859345     
   20.9103554149195        20.0799740660944        19.3032756802222     
   18.5409333231836        17.9512029734140     
  -8.27218258285040       -8.38966382097314       -8.45732989112119     
  -8.55719753282301       -8.67788785412958       -8.80223477700163     
  -8.94867591137937       -9.14847805753323     
 -7.517760151322192E-003  0.000000000000000E+000
   1.01011488554869       0.000000000000000E+000
   1.01417696195708       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
