         180           8
   16.3260032159444        15.5588661881752        14.7004806381956     
   13.9881428480863        13.3816724190372        12.6623176693246     
   11.9365081117454        11.1796784626074     
  -7.68351147475934       -7.78377002995054       -7.86655438384379     
  -7.99982380282041       -8.13803717951077       -8.32827843421707     
  -8.44804476962825       -8.49678396914198     
 -7.566927651524054E-003  0.000000000000000E+000
   1.01022123035235       0.000000000000000E+000
   1.01441869945998       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
