         180           8
   17.6301709660178        16.7727571183664        16.0168111018205     
   15.2266648869548        14.4219637468641        13.6227089543156     
   13.0000766971661        12.3613619098574     
  -8.04630930122911       -8.06491286097859       -8.13786883551394     
  -8.26494709736172       -8.41065590732235       -8.53541982634582     
  -8.69240479495742       -8.76097067650527     
 -7.490895849120653E-003  0.000000000000000E+000
   1.01041241293554       0.000000000000000E+000
   1.01395792009116       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
