         180           8
   20.6971442230912        19.8717557940926        19.1020499641200     
   18.4031775188073        17.6909387891061        16.9314877063874     
   16.2199819692774        15.4331576529341     
  -8.26511518048709       -8.36895424443908       -8.41244106425836     
  -8.53049204674201       -8.67758936134612       -8.82045439371446     
  -9.01439574950303       -9.09817801030487     
 -7.370311350245091E-003  0.000000000000000E+000
   1.01047826347896       0.000000000000000E+000
   1.01437758724211       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
