         180           8
   14.5075632298905        13.8986947607594        13.1829419952239     
   12.4024566013950        11.6924128051398        10.9727727104369     
   10.2051016878528        9.76136222204473     
  -7.23741971398882       -7.31451183606076       -7.43576618109816     
  -7.54495728021787       -7.67095513579002       -7.81401789666463     
  -7.93337577085769       -8.02192825721399     
 -7.756286222497794E-003  0.000000000000000E+000
   1.01095966047155       0.000000000000000E+000
   1.01494749255587       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
