         180           3
   24.4330068770358        21.5189389958504        18.7947335601334     
  -7.05979843742801       -7.26746694452002       -7.14197326829707     
  2.622964141702323E-003  0.000000000000000E+000
  0.988147571181973       0.000000000000000E+000
  0.985753106802266       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
