         180           8
   15.5897842652338        15.0291195675933        14.3216412158540     
   13.6263086763990        12.8369337610360        12.0411522559244     
   11.3642884736380        10.7620563285528     
  -7.44081921333688       -7.54274222563546       -7.64566296107086     
  -7.74451467088348       -7.87146985519646       -8.03204397509544     
  -8.18550112812465       -8.32194014345691     
 -7.699393323485457E-003  0.000000000000000E+000
   1.01084338446160       0.000000000000000E+000
   1.01486233333900       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
