         180           8
   14.5212004335377        13.7796126320165        12.9803190829052     
   12.1745613936419        11.4199439723529        10.7945738286925     
   10.2096232780729        9.39713915290031     
  -7.90116042556682       -7.88489109130073       -7.92493591718571     
  -8.08031107055975       -8.40712225031090       -8.60942639155336     
  -8.53711330912612       -8.52196539174524     
 -7.447311434085597E-003  0.000000000000000E+000
   1.00994037952443       0.000000000000000E+000
   1.01420310638492       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
