         180           8
   22.7096719019056        22.3639167064285        21.9818648584336     
   21.6528785895267        21.2708693912114        20.9321627488461     
   20.7165718285187        20.7100243147893     
  -7.90844158509737       -8.03412530024373       -8.14715849549196     
  -8.38829591414454       -8.88357793603107       -9.26569342248944     
  -9.56267953227278       -9.77011030548494     
 -6.860098930275707E-003  0.000000000000000E+000
   1.01020403089807       0.000000000000000E+000
   1.01409115640842       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
