         180           3
   27.7924721681320        25.7542917103861        24.1243090398046     
  -2.25081383195846       -2.46610447316117       -2.81884309276438     
  2.186147231611761E-003  0.000000000000000E+000
  0.988276540929807       0.000000000000000E+000
  0.985455060771418       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
