         180           8
   19.7917993261892        19.0838382345869        18.3547641199108     
   17.6858469636220        17.0486667026233        16.3561854007307     
   15.7773594150922        15.1666104215650     
  -5.16895627675723       -5.34004023986839       -5.42694792400368     
  -5.55759728533183       -5.71044683128192       -5.88641367756861     
  -6.01470762006076       -6.19943912364182     
 -7.683798514216811E-003  0.000000000000000E+000
   1.01064905118491       0.000000000000000E+000
   1.01472095910538       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
