         180           8
   20.6574455030273        19.8955068276520        19.2711283078632     
   18.5810061159646        17.9024535934641        17.2675420369468     
   16.6422397592819        16.0598053434375     
  -5.90301684496796       -6.04531300427303       -6.14782494389967     
  -6.28589793194253       -6.42629583695246       -6.58454208951018     
  -6.77809771510824       -6.87634178757151     
 -7.673765704948837E-003  0.000000000000000E+000
   1.01061573255095       0.000000000000000E+000
   1.01422977541782       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
