         180           8
   20.9063860306735        20.1091305474334        19.4541271081703     
   18.7873840957206        18.1088703082132        17.4533368896888     
   16.8170920760879        16.2701262067244     
  -6.19166787543278       -6.25795427672533       -6.28788247126026     
  -6.37410149338742       -6.50892629036289       -6.65455118027492     
  -6.81989079131883       -7.03353833978576     
 -7.680056622224666E-003  0.000000000000000E+000
   1.01075806922729       0.000000000000000E+000
   1.01432086021509       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
