         180           8
   23.4967695000183        22.8566691203824        22.3140839990393     
   21.6413627417732        20.9323384736417        20.2071858208801     
   19.4967480115267        18.8634104768348     
  -7.19679251337585       -7.33639255113884       -7.43726568838765     
  -7.47672703600630       -7.54507785483950       -7.70511872720074     
  -7.86930897725676       -8.06929371585910     
 -7.716474209919595E-003  0.000000000000000E+000
   1.01144168321290       0.000000000000000E+000
   1.01527739345577       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
