         180           3
   29.6806731998645        27.2140416237427        25.5168859600310     
  -4.87771562758562       -4.95256857503038       -4.78338757851166     
  2.034403808200334E-003  0.000000000000000E+000
  0.988403116309723       0.000000000000000E+000
  0.985702086221528       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
