         180           8
   1.41825857629991        1.17210188810034       0.878416714511013     
  0.636136564131612       0.440830062509331       0.217694481931154     
 -4.097262337595235E-002 -9.308313843380189E-002
  -8.70243103981510       -8.49499184357859       -8.27418863657342     
  -7.98917611719375       -7.67011486859777       -7.38676773644380     
  -7.16147944674921       -6.93766267970049     
 -8.684923343221828E-003  0.000000000000000E+000
   1.00958523349770       0.000000000000000E+000
   1.01355292727320       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
