         180           3
   7.52169849467521        8.63649145976011        10.3241091701802     
  -9.16827966057329       -8.21823425717834       -7.02099866486392     
  1.824073062213140E-003  0.000000000000000E+000
  0.987263358554645       0.000000000000000E+000
  0.984435762699250       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
