         180           8
   5.00295967699502        4.76882433074500        4.49643196506059     
   4.28532030105597        4.02385063880664        3.76692666968103     
   3.61883960600477        3.50110617906736     
  -9.35922362009916       -9.20706038833358       -8.90120406128486     
  -8.65189210539909       -8.44151949336612       -8.16734835382710     
  -7.91121711237811       -7.55394120763646     
 -8.659568259285159E-003  0.000000000000000E+000
   1.00936010224584       0.000000000000000E+000
   1.01419468387730       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
