         180           8
  0.282260091876581       0.111922848141708      -6.425111402348049E-002
 -0.230972892289833      -0.344092294990945      -0.432643522478538     
 -0.513915519939416      -0.567036942744065     
  -8.73675810872483       -8.60069182240642       -8.41323570127036     
  -8.18764095821400       -7.90172692797280       -7.64844191453757     
  -7.31795657862012       -7.03908631655024     
 -8.721232153495575E-003  0.000000000000000E+000
   1.00960657079165       0.000000000000000E+000
   1.01336869569560       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
