         180           8
   1.22907806919541        1.02045718626641       0.810346823353130     
  0.562957320172338       0.323639360045728       0.212639219128927     
  6.577215225411662E-002 -0.118736081574756     
  -8.77294595047194       -8.56239923887079       -8.33008362497765     
  -8.09085694897363       -7.80707056846794       -7.54782587612166     
  -7.26565359563731       -7.06424992495907     
 -8.782729935840498E-003  0.000000000000000E+000
   1.00949666579149       0.000000000000000E+000
   1.01364259889904       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
