         180           8
   3.59467484269406        3.28260463574812        3.04210533512076     
   2.76048530173612        2.43198120381514        2.07375655645340     
   1.85999821374970        1.44366363949278     
  -9.13940295769525       -8.91316859559193       -8.59852160697365     
  -8.27141959524888       -7.95547342469117       -7.69754142744296     
  -7.43384419309612       -7.19372036764002     
 -8.719664848819156E-003  0.000000000000000E+000
   1.00949492033886       0.000000000000000E+000
   1.01344343528498       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
